\begin{thebibliography}{131}
\expandafter\ifx\csname natexlab\endcsname\relax\def\natexlab#1{#1}\fi
\expandafter\ifx\csname url\endcsname\relax
  \def\url#1{{\tt #1}}\fi

\bibitem[LEG()]{LEGO}
PhD thesis.

\bibitem[Arentze et~al.(1998)Arentze, Hofmann, Joh, and
  Timmermans]{Timmermans:fvu}
T.A. Arentze, F.~Hofmann, C.H. Joh, and H.J.P. Timmermans.
\newblock Experiences with developing {ALBATROSS}: {A} learning-based
  transportation oriented simulation system.
\newblock In {\em Verkehr und {M}obilit{\"a}t}, number~66 in Stadt Region Land,
  pages 61--70. Institut f{\"u}r Stadtbauwesen, Technical University, Aachen,
  Germany, 1998.

\bibitem[Axhausen(1990)]{Axhausen:90}
K.W. Axhausen.
\newblock A simultaneous simulation of activity chains.
\newblock In P.M. Jones, editor, {\em New Approaches in Dynamic and
  Activity-based Approaches to Travel Analysis}, pages 206--225. Avebury,
  Aldershot, 1990.

\bibitem[Babin et~al.(1982)Babin, Florian, James-Lefebvre, and Spiess]{emme2:1}
A.~Babin, M.~Florian, L.~James-Lefebvre, and H.~Spiess.
\newblock {EMME/2}: {I}nteractive graphic method for road and transit planning.
\newblock {\em Transportation Research Record}, 866:\penalty0 1--9, 1982.

\bibitem[Bando et~al.(1994)Bando, Hasebe, Nakayama, Shibata, and
  Sugiyama]{Bando94}
M.~Bando, K.~Hasebe, A.~Nakayama, A.~Shibata, and Y.~Sugiyama.
\newblock Structure stability of congestion in traffic dynamics.
\newblock {\em Japan Journal of Industrial and Applied Mathematics},
  11(2):\penalty0 203--223, 1994.

\bibitem[Bando et~al.(1995)Bando, Hasebe, Nakayama, Shibata, and
  Sugiyama]{Bando:etc:pre}
M.~Bando, K.~Hasebe, A.~Nakayama, A.~Shibata, and Y.~Sugiyama.
\newblock Dynamical model of traffic congestion and numerical simulation.
\newblock {\em Phys.\ Rev.\ E}, 51\penalty0 (2):\penalty0 1035--1042, 1995.

\bibitem[Barlovic et~al.(1998)Barlovic, Santen, Schadschneider, and
  Schreckenberg]{Barlovic}
R.~Barlovic, L.~Santen, A.~Schadschneider, and M.~Schreckenberg.
\newblock Metastable states in {CA} models for traffic flow.
\newblock {\em European Physical Journal B}, 5\penalty0 (3):\penalty0 793--800,
  1998.

\bibitem[Barrett(Personal communication)]{Barrett:personal}
C.~L. Barrett, Personal communication.

\bibitem[Barrett et~al.(1995)Barrett, Eubank, Nagel, Riordan, and
  Wolinsky]{multi:res}
C.~L. Barrett, S.~Eubank, K.~Nagel, J.~Riordan, and M.~Wolinsky.
\newblock Issues in the representation of traffic using multi-resolution
  cellular automata.
\newblock {L}os {A}lamos {U}nclassified {R}eport ({LA-UR}) 95-2658, Los Alamos
  National Laboratory, Los Alamos, NM, U.S.A., see www.lanl.gov, 1995.

\bibitem[Barrett et~al.(2000)Barrett, Jacob, and
  Marathe]{Barrett:etc:formal-language}
C.~L. Barrett, R.~Jacob, and M.~V. Marathe.
\newblock Formal-language-constrained path problems.
\newblock {\em SIAM J COMPUT}, 30\penalty0 (3):\penalty0 809--837, 2000.

\bibitem[Barrett et~al.(1996)Barrett, Wolinsky, and Olesen]{Barrett:julich}
C.~L. Barrett, M.~Wolinsky, and M.~W. Olesen.
\newblock Emergent local control properties in particle hopping traffic
  simulations.
\newblock In D.E. Wolf, M.~Schreckenberg, and A.~Bachem, editors, {\em Traffic
  and granular flow}, pages 169--173. World Scientific, Singapore, 1996.

\bibitem[Beckman et~al.(1996)Beckman, Baggerly, and McKay]{Beckman:etc:pops}
R.~J. Beckman, K.~A. Baggerly, and M.~D. McKay.
\newblock Creating synthetic base-line populations.
\newblock {\em Transportion Research Part A -- {P}olicy and Practice},
  30\penalty0 (6):\penalty0 415--429, 1996.

\bibitem[{Beckman et al}(1997)]{Beckman:etc:case-study}
R.J. {Beckman et al}.
\newblock {TRANSIMS}--{R}elease 1.0 -- {T}he {D}allas-{F}ort~{W}orth case
  study.
\newblock {L}os {A}lamos {U}nclassified {R}eport ({LA-UR}) 97-4502, Los Alamos
  National Laboratory, Los Alamos, NM, see transims.tsasa.lanl.gov, 1997.

\bibitem[Ben-Akiva(2001)]{Ben-Akiva:Bonn}
M.~Ben-Akiva.
\newblock Route choice models.
\newblock Presented at the Workshop on ``Human Behaviour and Traffic
  Networks'', Bonn, December 2001.

\bibitem[Ben-Akiva and Lerman(1985)]{Ben-Akiva:book}
M.~Ben-Akiva and S.~R. Lerman.
\newblock {\em Discrete choice analysis}.
\newblock The MIT Press, Cambridge, MA, 1985.

\bibitem[Bottom(2000)]{Bottom:thesis}
J.A. Bottom.
\newblock {\em Consistent anticipatory route guidance}.
\newblock PhD thesis, Massachusetts Institute of Technology, Cambridge, MA,
  2000.

\bibitem[Bowman(1998)]{Bowman:thesis}
J.~L. Bowman.
\newblock {\em The day activity schedule approach to travel demand analysis}.
\newblock PhD thesis, Massachusetts Institute of Technology, Cambridge, MA,
  1998.

\bibitem[Bradley(1997)]{Bradley:report}
M.~Bradley.
\newblock A system of activity-based models for {P}ortland, {O}regon, {D}raft
  final report, 1997.

\bibitem[Brilon and Wu(1998)]{Brilon:Wu:CA}
W.~Brilon and N.~Wu.
\newblock Evaluation of cellular automata for traffic flow simulation on
  freeway and urban streets.
\newblock In W.~Brilon, F.~Huber, M.~Schreckenberg, and H.~Wallentowitz,
  editors, {\em Traffic and Mobility: {S}imulation -- {E}conomics --
  {E}nvironment}, pages 163--180. Springer, Berlin, 1998.

\bibitem[Burriad(2002)]{Burriad:suite}
A.~Burriad.
\newblock Intersection dynamics in queue models.
\newblock Term project report, Swiss Federal Institute of Technology, 2002.
\newblock See sim.inf.ethz.ch/papers.

\bibitem[Bush()]{Bush:personal}
B.~W. Bush.
\newblock Personal communication.

\bibitem[Cameron and Duncan(1996)]{PARAMICS}
G.~D.~B. Cameron and C.~I.~D. Duncan.
\newblock {PARAMICS} --- {P}arallel microscopic simulation of road traffic.
\newblock {\em Journal of Supercomputing}, 10(1):\penalty0 25, 1996.

\bibitem[Cantarella and Cascetta(1995)]{Cantarella:Cascetta}
C.~Cantarella and E.~Cascetta.
\newblock Dynamic process and equilibrium in transportation network: {T}owards
  a unifying theory.
\newblock {\em Transportation Science A}, 25\penalty0 (4):\penalty0 305--329,
  1995.

\bibitem[Cascetta et~al.(1993)Cascetta, Inaudi, and
  Marquis]{Cascetta:time-dep-OD}
E.~Cascetta, D.~Inaudi, and G.~Marquis.
\newblock Dynamic estimators of origin-destination matrices using traffic
  counts.
\newblock {\em Transportation Science}, 27\penalty0 (4):\penalty0 363--373,
  1993.

\bibitem[Cascetta and Papola(1998)]{Cascetta:etc:paths}
E.~Cascetta and A.~Papola.
\newblock An implicit availability/perception random utility model for path
  choice.
\newblock In {\em Proceedings of TRISTAN III}, volume~2, San Juan, Puerto Rico,
  1998.

\bibitem[Cassidy and Han(1995)]{Cassidy:validation}
M.J. Cassidy and J.~Han.
\newblock Validation and evaluation of freeway simulation models. final report.
\newblock Technical Report FHWA/CA/Purdue-RR-95-1, Purdue University, School of
  Civil Engineering, West Lafayette IN 47907, USA, 1995.

\bibitem[Chabini(1998{\natexlab{a}})]{Chabini:recycle:trb}
I.~Chabini.
\newblock Discrete dynamic shortest path problems in transportation
  applications: {C}omplexity and algorithms with optimal run time.
\newblock {\em Transportation Research Record}, 1645:\penalty0 170--175,
  1998{\natexlab{a}}.

\bibitem[Chabini(1998{\natexlab{b}})]{Chabini:recycle}
I.~Chabini.
\newblock Discrete dynamic shortest path problems in transportation
  applications: {C}omplexity and algorithms with optimal run time.
\newblock In {\em Transportation Research Record\/}
  \citep{Chabini:recycle:trb}, pages 170--175.

\bibitem[Chang et~al.(1985)Chang, Mahmassani, and Herman]{DYNASMART:basis}
G.L. Chang, H.S. Mahmassani, and R.~Herman.
\newblock A macroparticle traffic simulation model to investigate peak-period
  commuter decision dynamics.
\newblock {\em Transportation Research Record}, 1005:\penalty0 107--120, 1985.

\bibitem[Chowdhury et~al.(2000)Chowdhury, Santen, and
  Schadschneider]{Chow:etc:review}
D.~Chowdhury, L.~Santen, and A.~Schadschneider.
\newblock Statistical physics of vehicular traffic and some related systems.
\newblock {\em Physics Reports}, 329\penalty0 (4--6):\penalty0 199--329, May
  2000.

\bibitem[Chowdhury et~al.(1999)Chowdhury, Santen, Schadschneider, Sinha, and
  Pasupathy]{Chowdhury:etc:slow2start}
D.~Chowdhury, L.~Santen, A.~Schadschneider, S.~Sinha, and A.~Pasupathy.
\newblock Spatio-temporal organization of vehicles in a cellular automata model
  of traffic with 'slow-to-start' rule.
\newblock {\em J. Physics A: Math. General}, 32:\penalty0 3229, 1999.

\bibitem[Clarke et~al.(1963)Clarke, Krikorian, and Rausen]{Clarke:etc}
S.~Clarke, A.~Krikorian, and J.~Rausen.
\newblock Computing the $n$ best loopless paths in a network.
\newblock {\em J. Soc. Indust. Appl. Math.}, 11\penalty0 (4):\penalty0
  1096--1102, December 1963.

\bibitem[Cremer and Papageorgiou(1981)]{Cremer:parameters1}
M.~Cremer and M.~Papageorgiou.
\newblock Parameter identification for a traffic flow model.
\newblock {\em Automatica}, 17\penalty0 (6):\penalty0 837--843, 1981.

\bibitem[Cremer and Sch{\"u}tt(1990)]{Cremer:parameters2}
M.~Cremer and H.~Sch{\"u}tt.
\newblock A comprehensive concept for simultaneous state observation, parameter
  estimation, and incident detection.
\newblock In {\em Proceedings of the 11th Int.\ Symposium on Transportation and
  Traffic Theory}, Yokohama, Japan, 1990.

\bibitem[Daganzo et~al.(1999)Daganzo, Cassidy, and
  Bertini]{daganzo:critique:sync}
Carlos~F. Daganzo, M.~J. Cassidy, and R.~L. Bertini.
\newblock Possible explanations of phase transitions in highway traffic.
\newblock {\em Transportation Research A}, 33:\penalty0 365--379, 1999.

\bibitem[Denney et~al.(1993)Denney, Williams, Bhat, and
  Ardekani]{NETSIM:2fluid:calib}
R.W. Denney, J.C. Williams, S.C.S. Bhat, and S.A. Ardekani.
\newblock Calibrating {NETSIM} for a {CBD} using the two fluid model.
\newblock In {\em Large Urban Systems. Proceedings of the Advanced Traffic
  Management Conference}. Federal Highway Administration, 400 7th Street SW,
  Washington DC, USA, 1993.

\bibitem[Doherty and Axhausen(1998)]{Doherty:fvu}
S.~T. Doherty and K.~W. Axhausen.
\newblock The developement of a unified modelling framework for the household
  activity-travel scheduling process.
\newblock In {\em Verkehr und {M}obilit{\"a}t}, number~66 in Stadt Region Land.
  Institut f{\"u}r Stadtbauwesen, Technical University, Aachen, Germany, 1998.

\bibitem[Domencich and McFadden(1975)]{McFadden:book}
Th.~A. Domencich and D.~McFadden.
\newblock Urban travel demand.
\newblock In D.W. Jorgenson and J.~Waelbroeck, editors, {\em Urban travel
  demand}, number~93 in Contributions to Economic Analysis. North-Holland and
  American Elsevier, 1975.

\bibitem[Dongarra et~al.(1998)Dongarra, Duff, Sorensen, and van~der
  Vorst]{Dongarra:etc:book}
J.J. Dongarra, I.S. Duff, D.C. Sorensen, and H.A. van~der Vorst.
\newblock {\em Numerical linear algebra for high-performance computers}.
\newblock Software, Environments, and Tools. SIAM Society for Industrial and
  Applied Mathematics, Philadelphia, 1998.

\bibitem[{DYNAMIT}(accessed 2003)]{DYNAMIT}
{DYNAMIT}.
\newblock See its.mit.edu and dy\-na\-mic\-traf\-fic\-assign\-ment.org,
  accessed 2003.

\bibitem[{DYNASMART}(accessed 2003)]{DYNASMART}
{DYNASMART}.
\newblock See www.dynasmart.com and dy\-na\-mic\-traf\-fic\-assign\-ment.org,
  accessed 2003.

\bibitem[Esser(1998{\natexlab{a}})]{Esser:thesis}
J.~Esser.
\newblock {\em Simulation von {S}tadtverkehr auf der {B}asis zellularer
  {A}utomaten}.
\newblock PhD thesis, University of Duisburg, Germany, 1998{\natexlab{a}}.

\bibitem[Esser(1998{\natexlab{b}})]{OLSIM}
J.~Esser.
\newblock {\em Simulation von {S}tadtverkehr auf der {B}asis zellularer
  {A}utomaten}.
\newblock PhD thesis, University of Duisburg, Germany, 1998{\natexlab{b}}.
\newblock See also www.traffic.uni-duisburg.de.

\bibitem[Esser and Nagel(1998)]{Esser:Nagel:fvu}
J.~Esser and K.~Nagel.
\newblock Census-based travel demand generation for transportation simulations.
\newblock In W.~Brilon, F.~Huber, M.~Schreckenberg, and H.~Wallentowitz,
  editors, {\em Traffic and Mobility: {S}imulation -- {E}conomics --
  {E}nvironment}, pages 135--148, Berlin, 1998. Springer.

\bibitem[Frisch et~al.(1986)Frisch, Hasslacher, and Pomeau]{fhp}
U.~Frisch, B.~Hasslacher, and Y.~Pomeau.
\newblock Lattice-gas automata for navier-stokes equation.
\newblock {\em Phys.\ Rev.\ Letters}, 56:\penalty0 1505, 1986.

\bibitem[Gawron(1998{\natexlab{a}})]{Gawron:queue}
C.~Gawron.
\newblock An iterative algorithm to determine the dynamic user equilibrium in a
  traffic simulation model.
\newblock {\em International Journal of Modern Physics C}, 9\penalty0
  (3):\penalty0 393--407, 1998{\natexlab{a}}.

\bibitem[Gawron(1998{\natexlab{b}})]{Gawron:simple}
C.~Gawron.
\newblock An iterative algorithm to determine the dynamic user equilibrium in a
  traffic simulation model.
\newblock {\em International Journal of Modern Physics C}, 9\penalty0
  (3):\penalty0 393--407, 1998{\natexlab{b}}.

\bibitem[Gerlough and Huber(1975)]{Gerlough:Huber}
D.~L. Gerlough and M.~J. Huber.
\newblock {\em Traffic Flow Theory}.
\newblock Special Report No.\ 165. Transportation Research Board, National
  Research Council, Washington, D.C., 1975.

\bibitem[Gipps(1981)]{Gipps:following}
P.~G. Gipps.
\newblock A behavioural car-following model for computer simulation.
\newblock {\em Transportation Research B}, 15:\penalty0 105--111, 1981.

\bibitem[Gipps(1986)]{Gipps:2lane}
P.~G. Gipps.
\newblock A model for the structure of lane-changing decisions.
\newblock {\em Transportation Research B}, 20B\penalty0 (5):\penalty0 403--414,
  1986.

\bibitem[Gloor(2001)]{chgloor:diplom}
C.~Gloor.
\newblock Modelling of autonomous agents in a realistic road network (in
  {G}erman).
\newblock Diplomarbeit, Swiss Federal Institute of Technology ETH, Z{\"u}rich,
  Switzerland, 2001.

\bibitem[Haberman(1977)]{Haberman:book}
R.~Haberman.
\newblock {\em Mathematical models in mechanical vibrations, population
  dynamics, and traffic flow}.
\newblock Prentice-Hall, Englewood Cliffs, NJ, 1977.

\bibitem[Helbing(1997)]{Helbing:Verkehrsdynamik}
D.~Helbing.
\newblock {\em Verkehrsdynamik}.
\newblock Springer, Heidelberg, Germany, 1997.

\bibitem[Herman and Prigogine(1979)]{2fluid:basis}
R.~Herman and I.~Prigogine.
\newblock A two-fluid approach to town traffic.
\newblock {\em Science}, 204:\penalty0 148--151, 1979.

\bibitem[Hofbauer and Sigmund(1998)]{Hofb:Sigm:book}
J.~Hofbauer and K.~Sigmund.
\newblock {\em Evolutionary games and replicator dynamics}.
\newblock Cambridge University Press, 1998.

\bibitem[Holland(1992)]{Holland:book}
J.D. Holland.
\newblock {\em Adaptation in Natural and Artificial Systems}.
\newblock Bradford Books, 1992.
\newblock Reprint edition.

\bibitem[Jacob et~al.(1999)Jacob, Marathe, and Nagel]{Jacob:etc:comp}
R.~R. Jacob, M.~V. Marathe, and K.~Nagel.
\newblock A computational study of routing algorithms for realistic
  transportation networks.
\newblock {\em ACM Journal of Experimental Algorithms}, 4\penalty0 (1999es,
  {A}rticle {N}o.~6), 1999.

\bibitem[Jakobs and Gerling(1993)]{Jakobs:Gerling}
A.~Jakobs and R.W. Gerling.
\newblock Scaling aspects for the performance of parallel algorithms.
\newblock {\em Parallel Computing}, 19\penalty0 (9):\penalty0 1063--1073, 1993.

\bibitem[Jost and Nagel(2003)]{bkdn}
D.~Jost and K.~Nagel.
\newblock Probabilistic traffic flow breakdown in stochastic car following
  models.
\newblock Paper 03-4266, Transportation Research Board Annual Meeting,
  Washington, D.C., 2003.
\newblock Shorter version to be published in Transportation Research Records.

\bibitem[Kelly(1997)]{Kelly:1}
T.~Kelly.
\newblock Driver strategy and traffic system performance.
\newblock {\em Physica A}, 235:\penalty0 407, 1997.

\bibitem[Kerner(1998)]{Kerner:Konh:tgf97}
B.~S. Kerner.
\newblock Traffic flow: {E}xperiment and theory.
\newblock In D.E. Wolf and M.~Schreckenberg, editors, {\em Traffic and granular
  flow'97}, pages 239--267. Springer, Berlin, 1998.

\bibitem[Kerner and Konh\"auser(1994)]{Kerner:Konh:large:amplitude}
B.~S. Kerner and P.~Konh\"auser.
\newblock Structure and parameters of clusters in traffic flow.
\newblock {\em Phys.\ Rev.\ E}, 50\penalty0 (1):\penalty0 54--83, 1994.

\bibitem[Kerner and Rehborn(1996{\natexlab{a}})]{Kerner:Rehborn:mea1}
B.~S. Kerner and H.~Rehborn.
\newblock Experimental features and characteristics of traffic jams.
\newblock {\em Phys.\ Rev.\ E}, 53\penalty0 (2):\penalty0 R1297--R1300,
  1996{\natexlab{a}}.

\bibitem[Kerner and Rehborn(1996{\natexlab{b}})]{Kerner:Rehborn:mea2}
B.~S. Kerner and H.~Rehborn.
\newblock Experimental properties of complexity in traffic flow.
\newblock {\em Phys.\ Rev.\ E}, 53\penalty0 (5):\penalty0 R4275--R4278,
  1996{\natexlab{b}}.

\bibitem[Kim(1997)]{robot-soccer}
J.H. Kim.
\newblock Special issue about the first micro-robot world cup soccer
  tournament, {MIROSOT}.
\newblock {\em Robotics and Autonomous Systems}, 21\penalty0 (2):\penalty0
  137--205, 1997.

\bibitem[Krau{\ss}(1997)]{Krauss:phd}
S.~Krau{\ss}.
\newblock {\em Microscopic modeling of traffic flow: {I}nvestigation of
  collision free vehicle dynamics}.
\newblock PhD thesis, University of {C}ologne, Germany, 1997.
\newblock See www.zaik.uni-koeln.de/\verb#~#paper.

\bibitem[Krau{\ss} et~al.(1998)Krau{\ss}, Nagel, and Wagner]{isttt-flow}
S.~Krau{\ss}, K.~Nagel, and P.~Wagner.
\newblock The mechanism of flow breakdown in traffic flow models.
\newblock Technical report, 1998.

\bibitem[Krau{\ss} et~al.(1997)Krau{\ss}, Wagner, and
  Gawron]{Krauss:etc:metastable}
S.~Krau{\ss}, P.~Wagner, and C.~Gawron.
\newblock Metastable states in a microscopic model of traffic.
\newblock {\em Phys.\ Rev.\ E}, 55\penalty0 (5):\penalty0 5597--5602, 1997.

\bibitem[K\"uhne and Beckschulte(1993)]{Kuehne:93}
R.D. K\"uhne and R.~Beckschulte.
\newblock Non-linearity stochastics of unstable traffic flow.
\newblock In C.F. Daganzo, editor, {\em Proc.\ 12th Int.\ Symposium on Theory
  of Traffic Flow and Transportation}, page 367. Elsevier, Amsterdam, The
  Netherlands, 1993.

\bibitem[Lighthill and Whitham(1955)]{LW1955}
M.~J. Lighthill and J.~B. Whitham.
\newblock On kinematic waves. {I}: {F}low movement in long rivers. {II}: {A}
  {T}heory of traffic flow on long crowded roads.
\newblock {\em Proceedings of the Royal Society A}, 229:\penalty0 281--345,
  1955.

\bibitem[Lohse(1997)]{Lohse:book}
D.~Lohse.
\newblock {\em Verkehrsplanung}, volume~2 of {\em Grundlagen der
  Stra{\ss}enverkehrstechnik und der Verkehrsplanung}.
\newblock Verlag f{\"u}r Bauwesen, Berlin, 1997.

\bibitem[Mahmassani et~al.(1987)Mahmassani, Williams, and
  Herman]{2fluid:vs:NETSIM}
H.S. Mahmassani, J.C. Williams, and R.~Herman.
\newblock Performance of urban traffic networks.
\newblock In N.H. Gartner and N.H.M. Wilson, editors, {\em Transportation and
  Traffic Theory}, page~1. Elsevier Science Publishing Co., Inc., 1987.

\bibitem[May(1990)]{May:book}
A.D. May.
\newblock {\em Traffic flow fundamentals}.
\newblock Prentice Hall, Englewood Cliffs, NJ, 1990.

\bibitem[Metaxatos et~al.(1995)Metaxatos, Boyce, Florian, and
  Constantin]{emme2:od}
P.~Metaxatos, D.~Boyce, M.~Florian, and I.~Constantin.
\newblock Implementing combined model of origin-destination and route choice in
  {EMME/2} system.
\newblock {\em Transportation Research Records}, 1493:\penalty0 57--63, 1995.

\bibitem[{MITSIM}(1999)]{MITSIM}
{MITSIM}, 1999.
\newblock {M}assachusetts {I}nstitute of {T}echnology, {C}ambridge,
  {M}assachusetts. See its.mit.edu.

\bibitem[{MPI www page}(accessed 2003)]{MPI}
{MPI www page}.
\newblock www{-}unix.mcs.anl.gov/mpi/, accessed 2003.
\newblock {MPI}: Message Passing Interface.

\bibitem[Nagel(1992)]{Nagel:PhysComp}
K.~Nagel.
\newblock Freeway traffic, cellular automata, and some (self-organizing)
  criticality.
\newblock In R.A. de~Groot and J.~Nadrchal, editors, {\em Physics Computing
  '92}, page 419, Prague, 1992. World Scientific.

\bibitem[Nagel(1996)]{Nagel:flow:pre}
K.~Nagel.
\newblock Particle hopping models and traffic flow theory.
\newblock {\em Phys.\ Rev.\ E}, 53\penalty0 (5):\penalty0 4655--4672, 1996.

\bibitem[Nagel(1999)]{Nagel:flow:trb}
K.~Nagel.
\newblock From particle hopping models to traffic flow theory.
\newblock {\em Transportation {R}esearch {R}ecords}, 1644:\penalty0 1--9, 1999.

\bibitem[Nagel and Barrett(1997)]{Nagel:Barrett:feedback}
K.~Nagel and C.L. Barrett.
\newblock Using microsimulation feedback for trip adaptation for realistic
  traffic in {Dallas}.
\newblock {\em International Journal of Modern Physics C}, 8\penalty0
  (3):\penalty0 505--526, 1997.

\bibitem[Nagel and Herrmann(1993)]{Nagel:Herrmann}
K.~Nagel and H.~J. Herrmann.
\newblock Deterministic models for traffic jams.
\newblock {\em Physica A}, 199:\penalty0 254, 1993.

\bibitem[Nagel and Paczuski(1995)]{Nagel:Paczuski}
K.~Nagel and M.~Paczuski.
\newblock Emergent traffic jams.
\newblock {\em Phys.\ Rev.\ E}, 51:\penalty0 2909--2918, 1995.

\bibitem[Nagel and Rasmussen(1994{\natexlab{a}})]{Nagel:alife}
K.~Nagel and S.~Rasmussen.
\newblock Traffic at the edge of chaos.
\newblock In R.~A. Brooks and P.~Maes, editors, {\em Artificial Life IV:
  Proceedings of the Fourth International Workshop on the Synthesis and
  Simulation of Living Systems}, pages 222--235. MIT Press, Cambridge, MA,
  1994{\natexlab{a}}.

\bibitem[Nagel and Rasmussen(1994{\natexlab{b}})]{Nagel:Rasmussen}
K.~Nagel and S.~Rasmussen.
\newblock Traffic at the edge of chaos.
\newblock In R.~A. Brooks and P.~Maes, editors, {\em Artificial Life IV:
  Proceedings of the Fourth International Workshop on the Synthesis and
  Simulation of Living Systems}, pages 222--235. MIT Press, Cambridge, MA,
  1994{\natexlab{b}}.

\bibitem[Nagel et~al.(2000)Nagel, Rickert, Simon, and
  Pieck]{Nagel:etc:tristan-succ}
K.~Nagel, M.~Rickert, P.~M. Simon, and M.~Pieck.
\newblock The dynamics of iterated transportation simulations.
\newblock See www.arXiv.org, nlin.AO/0002040, 2000.
\newblock Earlier version in: Proceedings of 3rd TRIannual Symposium on
  Transportation ANalysis (TRISTAN-III) 1998 in San Juan, Puerto Rico.

\bibitem[Nagel and Schleicher(1994)]{Nagel:Schleicher}
K.~Nagel and A.~Schleicher.
\newblock Microscopic traffic modeling on parallel high performance computers.
\newblock {\em Parallel Computing}, 20:\penalty0 125--146, 1994.

\bibitem[Nagel and Schreckenberg(1992)]{Nagel:Schreck}
K.~Nagel and M.~Schreckenberg.
\newblock A cellular automaton model for freeway traffic.
\newblock {\em Journal de Physique I France}, 2:\penalty0 2221--2229, 1992.

\bibitem[Nagel et~al.(1997)Nagel, Stretz, Pieck, Leckey, Donnelly, and
  Barrett]{Nagel:etc:flow-char}
K.~Nagel, P.~Stretz, M.~Pieck, S.~Leckey, R.~Donnelly, and C.~L. Barrett.
\newblock {TRANSIMS} traffic flow characteristics.
\newblock {L}os {A}lamos {U}nclassified {R}eport ({LA-UR}) 97-3530, Los Alamos
  National Laboratory, Los Alamos, NM, see transims.tsasa.lanl.gov, 1997.

\bibitem[Nagel et~al.(2003)Nagel, Wagner, and Woesler]{or-review}
K.~Nagel, P.~Wagner, and R.~Woesler.
\newblock Still flowing: Approaches to traffic flow and traffic jam modeling.
\newblock {\em Operations Research}, 51\penalty0 (5):\penalty0 681--710, 2003.

\bibitem[Nagel et~al.(1998)Nagel, Wolf, Wagner, and Simon]{Nagel:etc:2lane}
K.~Nagel, D.E. Wolf, P.~Wagner, and P.~M. Simon.
\newblock Two-lane traffic rules for cellular automata: A systematic approach.
\newblock {\em Phys.\ Rev.\ E}, 58\penalty0 (2):\penalty0 1425--1437, 1998.

\bibitem[Niedringhaus et~al.(1994)Niedringhaus, Opper, Rhodes, and
  Hughes]{THOREAU:performance}
W.~Niedringhaus, J.~Opper, L.~Rhodes, and B.~Hughes.
\newblock {IVHS} traffic modeling using parallel computing: {P}erformance
  results.
\newblock In {\em Proceedings of the International Conference on Parallel
  Processing}, pages 688--693. IEEE, 1994.

\bibitem[Ort\'uzar and Willumsen(1995)]{Ortuzar:Willumsen}
J.~de~D. Ort\'uzar and L.G. Willumsen.
\newblock {\em Modelling transport}.
\newblock Wiley, Chichester, 1995.

\bibitem[Palmer(1989)]{Palmer:broken:ergodicity}
R.~Palmer.
\newblock Broken ergodicity.
\newblock In D.~L. Stein, editor, {\em Lectures in the Sciences of Complexity},
  volume~I of {\em Santa Fe Institute Studies in the Sciences of Complexity},
  pages 275--300. Addison-Wesley, Redwood City, CA, 1989.

\bibitem[Park and Rilett(1997)]{Rilett:reasonable-paths}
D.~Park and L.~R. Rilett.
\newblock Identifying multiple and reasonable paths in transportation networks:
  {A} heuristic approach.
\newblock {\em Transportation Research Records}, 1607:\penalty0 31--37, 1997.

\bibitem[Patriksson(1994)]{Patriksson:book}
Michael Patriksson.
\newblock {\em The Traffic Assignment Problem: Models and Methods}.
\newblock Topics in Transportation. VSP, Zeist, The Netherlands, 1994.

\bibitem[Perko(1986)]{Perko}
A.~Perko.
\newblock Implementation of algorithms for $k$ shortest loopless paths.
\newblock {\em Networks}, 16:\penalty0 149--160, 1986.

\bibitem[Ponzlet and Wagner(1996)]{Ponzlet:Wagner:CA-validation}
M.~Ponzlet and P.~Wagner.
\newblock Validation of a {CA}--model for traffic simulation of the
  {N}orthrhine-{W}estphalia motorway network.
\newblock In {\em The 24th European Transport Forum, Proceedings}, volume
  P404-1, 1996.

\bibitem[{PVM www page}(accessed 2003)]{PVM}
{PVM www page}.
\newblock www.epm.ornl.gov/pvm/, accessed 2003.
\newblock {PVM}: {P}arallel {V}irtual {M}achine.

\bibitem[Rakha and {Van Aerde}(1996)]{INTEGRATION}
H.~A. Rakha and M.~W. {Van Aerde}.
\newblock Comparison of simulation modules of {TRANSYT} and {INTEGRATION}
  models.
\newblock {\em Transportation Research Record}, 1566:\penalty0 1--7, 1996.

\bibitem[Rickert(1998)]{Rickert:phd}
M.~Rickert.
\newblock {\em Traffic simulation on distributed memory computers}.
\newblock PhD thesis, University of Cologne, Cologne, Germany, 1998.
\newblock available via www.zaik.uni-koeln.de/\verb#~#paper.

\bibitem[Rickert et~al.(1996{\natexlab{a}})Rickert, Nagel, Schreckenberg, and
  Latour]{Rickert:etc:twolane}
M.~Rickert, K.~Nagel, M.~Schreckenberg, and A.~Latour.
\newblock Two lane traffic simulations using cellular automata.
\newblock {\em Physica A}, 231\penalty0 (4):\penalty0 534--550,
  1996{\natexlab{a}}.

\bibitem[Rickert et~al.(1996{\natexlab{b}})Rickert, Nagel, Schreckenberg, and
  Latour]{Rickert:etc:2lane}
M.~Rickert, K.~Nagel, M.~Schreckenberg, and A.~Latour.
\newblock Two lane traffic simulations using cellular automata.
\newblock {\em Physica A}, 231:\penalty0 534, 1996{\natexlab{b}}.

\bibitem[Rothwell(1994)]{Rothwell:book}
J.D. Rothwell.
\newblock {\em Control of Human Voluntary Movement}.
\newblock Chapman and Hall, 1994.

\bibitem[Sauermann and Herrmann(1998)]{Sauermann}
G.~Sauermann and H.J. Herrmann.
\newblock A 1d traffic model with threshold parameters.
\newblock In D.E. Wolf and M.~Schreckenberg, editors, {\em Traffic and granular
  flow'97}, pages 481--486. Springer, Berlin, 1998.

\bibitem[Schadschneider(1998)]{Schadschneider:tgf2}
A.~Schadschneider.
\newblock Analytical approaches to cellular automata for traffic flow:
  Approximations and exact solutions.
\newblock In D.E. Wolf and M.~Schreckenberg, editors, {\em Traffic and granular
  flow'97}, pages 417--432. Springer, Berlin, 1998.

\bibitem[Schadschneider and Schreckenberg(1993)]{Schadschn.Schreck}
A.~Schadschneider and M.~Schreckenberg.
\newblock Cellular automaton models and traffic flow.
\newblock {\em J. Physics A: Math. General}, 26:\penalty0 L679, 1993.

\bibitem[Schwerdtfeger(1987)]{DYNEMO}
T.~Schwerdtfeger.
\newblock {\em Ma\-kro\-sko\-pi\-sches {S}i\-mu\-la\-tions\-mo\-dell f{\"u}r
  {S}chnell\-stra{\ss}en\-net\-ze mit {B}e\-r{\"u}ck\-sich\-ti\-gung von
  {E}in\-zel\-fahr\-zeu\-gen ({DYNEMO})}.
\newblock PhD thesis, University of Karsruhe, Germany, 1987.

\bibitem[Sheffi(1985)]{Sheffi:book}
Y.~Sheffi.
\newblock {\em Urban transportation networks: Equilibrium analysis with
  mathematical programming methods}.
\newblock Prentice-Hall, Englewood Cliffs, NJ, USA, 1985.

\bibitem[Simon and Nagel(1999)]{Simon:Nagel:queue}
P.~M. Simon and K.~Nagel.
\newblock Simple queueing model applied to the city of {P}ortland.
\newblock {\em International Journal of Modern Physics C}, 10\penalty0
  (5):\penalty0 941--960, 1999.

\bibitem[Sparmann(1978)]{Sparmann:2lane}
U.~Sparmann.
\newblock {\em Spurwechselvorg\"ange auf zweispurigen
  {BAB}--{R}ichtungsfahrbahnen}.
\newblock Number 263 in Forschung {S}tra\ss enbau und {S}tra\ss
  enverkehrstechnik. Bundesminister f\"ur {V}erkehr, Bonn--Bad Godesberg,
  Germany, 1978.

\bibitem[Sternad()]{Sternad:personal}
D.~Sternad.
\newblock personal communication.

\bibitem[{TRANSIMS www page}(accessed 2003)]{TRANSIMS}
{TRANSIMS www page}.
\newblock {TR}ansportation {AN}alysis and {SIM}ulation {S}ystem.
\newblock transims.tsasa.lanl.gov, accessed 2003.
\newblock {L}os Alamos National Laboratory, Los Alamos, NM.

\bibitem[{Transportation Research Board}(1994{\natexlab{a}})]{HCM}
{Transportation Research Board}.
\newblock {\em Highway Capacity Manual}.
\newblock In {\em Special Report No.\ 209\/}, \citet{HCM:94}, 3rd edition,
  1994{\natexlab{a}}.

\bibitem[{Transportation Research Board}(1994{\natexlab{b}})]{HCM:94}
{Transportation Research Board}.
\newblock {\em Highway Capacity Manual}.
\newblock Special Report No.\ 209. National Research Council, Washington, DC,
  3rd edition, 1994{\natexlab{b}}.

\bibitem[Unger(1998)]{Unger:hpc98}
H.~Unger.
\newblock An approach using neural networks for the control of the behaviour of
  autonomous individuals.
\newblock In A.~Tentner, editor, {\em High Performance Computing 1998}, pages
  98--103. The Society for Computer Simulation International, 1998.

\bibitem[Unger(2002)]{Unger:phd}
H.~Unger.
\newblock {\em Modellierung des Verhaltens autonomer Verkehrsteilnehmer in
  einer variablen staedtischen Umgebung}.
\newblock PhD thesis, TU Berlin, 2002.

\bibitem[Van~{A}erde(personal communication)]{VanAerde:personal}
M.~Van~{A}erde, personal communication.

\bibitem[Van~Aerde et~al.(1996)Van~Aerde, Hellinga, Baker, and
  Rakha]{INTEGRATION:overview}
M.~Van~Aerde, B.~Hellinga, M.~Baker, and H.~Rakha.
\newblock {INTEGRATION}: An overview of traffic simulation features.
\newblock 1996.
\newblock A paper accepted for presentation at the 1996 {T}ransportation
  {R}esearch {B}oard {A}nnual meeting.

\bibitem[{Van Leeuwen}(1990)]{Leeuwen}
J.~{Van Leeuwen}, editor.
\newblock {\em Formal models and semantics}, volume~B of {\em Handbook of
  Theoretical Computer Science}, 1990. Elsevier and MIT Press.

\bibitem[{VISSIM www page}(accessed 2003)]{VISSIM}
{VISSIM www page}.
\newblock www.ptv.de, accessed 2003.
\newblock {P}lanung {T}ransport und {V}erkehr ({PTV}) {GmbH}.

\bibitem[Wagner(1996)]{Wagner:julich}
P.~Wagner.
\newblock Traffic simulations using cellular automata: Comparison with reality.
\newblock In D~E Wolf, M.Schreckenberg, and A.Bachem, editors, {\em Traffic and
  Granular Flow}. World Scientific, Singapore, 1996.

\bibitem[Wagner and Nagel(1999)]{Wagner:Nagel:acts}
P.~Wagner and K.~Nagel.
\newblock Microscopic modeling of travel demand: {A}pproaching the home-to-work
  problem.
\newblock Paper 99\,09\,19, Transportation Research Board Annual Meeting,
  Washington, D.C., 1999.

\bibitem[Wagner et~al.(1997)Wagner, Nagel, and Wolf]{Wagner:etc:2lane}
P.~Wagner, K.~Nagel, and D.E. Wolf.
\newblock Realistic multi-lane traffic rules for cellular automata.
\newblock {\em Physica A}, 234:\penalty0 687, 1997.

\bibitem[Weinmann(in preparation)]{Weinmann:phd}
S.~Weinmann.
\newblock {\em Simulation of spatial learning mechanisms}.
\newblock PhD thesis, Swiss Federal Institute of Technology ETH, Z{\"u}rich,
  Switzerland, in preparation.

\bibitem[Wiedemann(1994)]{Wiedemann:model}
R.~Wiedemann.
\newblock Simulation des {S}tra\ss enverkehrsflusses.
\newblock Schriftenreihe {H}eft 8, Institute for Transportation Science,
  University of Karlsruhe, Germany, 1994.

\bibitem[Wiedemann(1995)]{Wiedemann:2lane:data}
R.~Wiedemann.
\newblock Beschreibung des {S}taus.
\newblock In H.~Keller, editor, {\em Beitr{\"a}ge zur {T}heorie des
  Stra{\ss}enverkehrs}. Forschungsgesellschaft f\"ur {S}tra\ss en- und
  {V}erkehrswesen, K\"oln, Germany, 1995.

\bibitem[Wolf(1999)]{dwolf:ca4traff:review}
D.E. Wolf.
\newblock Cellular automata for traffic simulations.
\newblock {\em Physica A}, 263:\penalty0 438--451, 1999.

\bibitem[Wolfram(1986)]{Wolfram:book}
S.~Wolfram.
\newblock {\em Theory and Applications of Cellular Automata}.
\newblock World Scientific, Singapore, 1986.

\bibitem[www{-}users.cs.umn.edu/{{\~~}$\!$}karypis/metis/(accessed
  2003)]{METIS}
www{-}users.cs.umn.edu/{{\~~}$\!$}karypis/metis/.
\newblock {METIS} library, accessed 2003.

\bibitem[Yen(1971)]{ar:yen}
Yin~Y. Yen.
\newblock Finding the $k$ shortest loopless paths in a network.
\newblock {\em Management Science}, 17\penalty0 (11):\penalty0 712--716, July
  1971.

\bibitem[Yukawa and Kikuchi(1995)]{Yukawa:coupled-map}
S.~Yukawa and M.~Kikuchi.
\newblock Coupled-map modeling of one-dimensional traffic flow.
\newblock {\em Journal of the Physical Society of Japan}, 64\penalty0
  (1):\penalty0 35--38, 1995.

\end{thebibliography}
