\begin{thebibliography}{28}
\expandafter\ifx\csname natexlab\endcsname\relax\def\natexlab#1{#1}\fi
\expandafter\ifx\csname url\endcsname\relax
  \def\url#1{\texttt{#1}}\fi
\expandafter\ifx\csname urlprefix\endcsname\relax\def\urlprefix{URL }\fi

\bibitem[{Arnott \textit{et~al.}(1993)Arnott, Palma and
  Lindsay}]{Arnott:etc:bottleneck}
Arnott, R., A.~D. Palma and R.~Lindsay (1993) A structural model of peak-period
  congestion: A traffic bottleneck with elastic demand, \textit{The American
  Economic Review}, \textbf{83}~(1) 161.

\bibitem[{Beckman \textit{et~al.}(1996)Beckman, Baggerly and
  McKay}]{Beckman:pops}
Beckman, R.~J., K.~A. Baggerly and M.~D. McKay (1996) Creating synthetic
  base-line populations, \textit{Transportion Research Part A -- {P}olicy and
  Practice}, \textbf{30}~(6) 415--429.

\bibitem[{Ben-Akiva and Lerman(1985)}]{Ben-Akiva:book}
Ben-Akiva, M. and S.~R. Lerman (1985) \textit{Discrete choice analysis}, The
  MIT Press, Cambridge, MA.

\bibitem[{Bliemer(2003)}]{Bliemer:personal}
Bliemer, M. (2003) personal communication, m.bliemer@citg.tudelft.nl.

\bibitem[{Bottom(2000)}]{Bottom:thesis}
Bottom, J. (2000) Consistent anticipatory route guidance, Ph.D. thesis,
  Massachusetts Institute of Technology, Cambridge, MA.

\bibitem[{Bowman(1998)}]{Bowman:thesis}
Bowman, J.~L. (1998) The day activity schedule approach to travel demand
  analysis, Ph.D. thesis, Massachusetts Institute of Technology, Cambridge, MA.

\bibitem[{Cascetta and Cantarella(1991)}]{Cascetta:Cantarella:day2day}
Cascetta, E. and C.~Cantarella (1991) A day-to-day and within day dynamic
  stochastic assignment model, \textit{Transportation Research A},
  \textbf{25A}~(5) 277--291.

\bibitem[{Cetin and Nagel(2003{\natexlab{a}})}]{queue}
Cetin, N. and K.~Nagel (2003{\natexlab{a}}) A large-scale agent-based traffic
  microsimulation based on queue model, in \textit{Swiss Transport Research
  Conference}, Monte Verita, Switzerland, March 2003. See www.strc.ch.

\bibitem[{Cetin and Nagel(2003{\natexlab{b}})}]{queue-trb03}
Cetin, N. and K.~Nagel (2003{\natexlab{b}}) Parallel queue model approach to
  traffic microsimulations, \textit{Paper}, \textbf{03-4272}, Transportation
  Research Board Annual Meeting, Washington, D.C.

\bibitem[{Charypar and Nagel(2003)}]{ga4acts}
Charypar, D. and K.~Nagel (2003) Generating complete all-day activity plans
  with genetic algorithms.

\bibitem[{Daganzo(1998)}]{Daganzo:assign-w-queues}
Daganzo, C. (1998) Queue spillovers in transportation networks with a route
  choice, \textit{Transportation Science}, \textbf{32}~(1) 3--11.

\bibitem[{de~Palma and Marchal(2002)}]{METROPOLIS}
de~Palma, A. and F.~Marchal (2002) Real case applications of the fully dynamic
  {METROPOLIS} tool-box: an advocacy for large-scale mesoscopic transportation
  systems, \textit{Networks and Spatial Economics}.

\bibitem[{{DYNAMIT www page}(accessed 2003)}]{DYNAMIT}
{DYNAMIT www page} (accessed 2003) {M}assachusetts {I}nstitute of {T}echnology,
  {C}ambridge, {M}assachusetts. See its.mit.edu. Also see
  dy\-na\-mic\-traf\-fic\-assign\-ment.org.

\bibitem[{{DYNASMART www page}(accessed 2003)}]{DYNASMART}
{DYNASMART www page} (accessed 2003) See www.dynasmart.com. Also see
  dy\-na\-mic\-traf\-fic\-assign\-ment.org.

\bibitem[{Friedrich \textit{et~al.}(2000)Friedrich, Hofs{\"a}{\ss}, N{\"o}kel
  and Vortisch}]{VISUM:dynamic}
Friedrich, M., I.~Hofs{\"a}{\ss}, K.~N{\"o}kel and P.~Vortisch (2000) A dynamic
  traffic assignment method for planning and telematic applications, in
  \textit{Proceedings of Seminar K}, European Transport Conference, Cambridge,
  GB.

\bibitem[{Gawron(1998)}]{Gawron:queue}
Gawron, C. (1998) An iterative algorithm to determine the dynamic user
  equilibrium in a traffic simulation model, \textit{International Journal of
  Modern Physics C}, \textbf{9}~(3) 393--407.

\bibitem[{Jacob \textit{et~al.}(1999)Jacob, Marathe and Nagel}]{Jacob:etc:comp}
Jacob, R.~R., M.~V. Marathe and K.~Nagel (1999) A computational study of
  routing algorithms for realistic transportation networks, \textit{ACM Journal
  of Experimental Algorithms}, \textbf{4}~(1999es, {A}rticle {N}o.~6).

\bibitem[{Kaufman \textit{et~al.}(1991)Kaufman, Wunderlich and
  Smith}]{Kaufman:etc:91}
Kaufman, D.~E., K.~E. Wunderlich and R.~L. Smith (1991) An iterative
  routing/assignment method for anticipatory real-time route guidance,
  \textit{Tech. Rep.}, \textbf{IVHS Technical Report 91-02}, University of
  Michigan Department of Industrial and Operations Engineering, Ann Arbor MI
  48109, May 1991.

\bibitem[{Nagel(1994/95)}]{Nagel:thesis}
Nagel, K. (1994/95) High-speed microsimulations of traffic flow, Ph.D. thesis,
  University of Cologne. See www.inf.ethz.ch/\verb#~#nagel/papers.

\bibitem[{Raney \textit{et~al.}(2003)Raney, Cetin, V{\"o}llmy, Vrtic, Axhausen
  and Nagel}]{ch}
Raney, B., N.~Cetin, A.~V{\"o}llmy, M.~Vrtic, K.~Axhausen and K.~Nagel (2003)
  An agent-based microsimulation model of {S}wiss travel: First results,
  \textit{Networks and Spatial Economics}, \textbf{3}~(1) 23--41. Similar
  version Transportation Research Board Annual Meeting 2003 paper number
  03-4267.

\bibitem[{Raney and Nagel(2002)}]{Raney:Nagel:strc2002}
Raney, B. and K.~Nagel (2002) Iterative route planning for modular
  transportation simulation, in \textit{Proceedings of the Swiss Transport
  Research Conference}, Monte Verita, Switzerland, March 2002. See www.strc.ch.

\bibitem[{Raney and Nagel(2003)}]{agdb}
Raney, B. and K.~Nagel (2003) Truly agent-based strategy selection for
  transportation simulations, \textit{Paper}, \textbf{03-4258}, Transportation
  Research Board Annual Meeting, Washington, D.C.

\bibitem[{Raney and Nagel(submitted)}]{fgcs}
Raney, B. and K.~Nagel (submitted) Iterative route planning for large-scale
  modular transportation simulations, \textit{Future Generation Computer
  Systems}. See sim.inf.ethz.ch/papers.

\bibitem[{Schneider(2003)}]{Schneider:act-times}
Schneider, A. (2003) Genetische {A}lgorithmen zur {O}ptimierung von
  {T}agespl{\"a}nen f{\"u}r {V}erkehrsteilnehmer, Term project, Swiss Federal
  Institute of Technology (ETH), Zurich, Switzerland. See
  www.sim.inf.ethz.ch/papers.

\bibitem[{{TRANSIMS Portland Study Reports www page}(accessed
  2003)}]{TRANSIMS:Portland}
{TRANSIMS Portland Study Reports www page} (accessed 2003)
  transims.tsasa.lanl.gov/PortlandStudyReports.html.

\bibitem[{{TRANSIMS www page}(accessed 2003)}]{TRANSIMS}
{TRANSIMS www page} (accessed 2003) {TR}ansportation {AN}alysis and
  {SIM}ulation {S}ystem, transims.tsasa.lanl.gov. {L}os Alamos National
  Laboratory, Los Alamos, NM.

\bibitem[{Vaughn \textit{et~al.}(1997)Vaughn, Speckman and
  Pas}]{Vaughn:etc:HATPs}
Vaughn, K., P.~Speckman and E.~Pas (1997) Generating household activity-travel
  patterns {(HATPs)} for synthetic populations.

\bibitem[{Watling(1996)}]{Watling:stochastic}
Watling, D. (1996) Asymmetric problems and stochastic process models of traffic
  assignment, \textit{Transportation Research B}, \textbf{30}~(5) 339--357.

\end{thebibliography}
